Page 1

Mathematics 120b Quiz 1, September 12, 1997

1. Determine whether ( ) is odd, even, or neither.

0 B Ø^{B#� "}_B 1) odd 2) even 3) neither

Answer:

2. Relative to the graph of , the graph of 2 is changed in what way?

CØ B CØ ‚B� „ # # 1) shifted 2 units up 2) compressed vertically by the factor 2 3) compressed horizontally by the factor 2 4) shifted 2 units to the left 5) shifted 2 units to the right 6) shifted 2 units down 7) stretched vertically by the factor 2 8) stretched horizontally by the factor 2 Answer:

3. Find the final digit in the number 312 .^{"**(}

1) 1 2) 2 3) 3 4) 4 6) 6 7) 7 8) 8 9) 9 Answer:

4. The displacement in meters of a particle moving in a straight line is given by , where is

=Ø > � > > # measured in seconds. Find the average velocity in meters per second over the time period ” ˙ »

1 2 .

1) 1 2) 2 3) 3 4) 4 5) 5 6) 6 7) 7 8) 8 Answer:

5. Find the value of the limit lim . B‹ #^� B� B� | 2 | 2 1) 1 2) 2 3) 1 2 4) 4 ¶ 4) 1 5) -2 6) -4 7) 1 2

� � ¶ Answer: